-10 -8 -6 -4 -2 0 2 4 6 8 10 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

Screen Position (mm) at 50cm from Single Slit

Relative Intensity

Theoretical Diffraction Pattern from a Single Slit of Width = 120μm