MASSACHUSETTS INSTITUTE OF TECHNOLOGY Department of Physics Physics 8.286 Fall 2013

FINAL WEIGHTED AVERAGE GRADE HISTOGRAM

Date: December 20, 2013

Students: 32 Mean: 86.4 Standard Deviation: 11.1 Bars show bins of 5, arrows show bins of 1.

Grade Range Number Percent Number Percent A 83.5–100 21 65.6

A+ 93.8–100 9 28.1 A 87.8–93.7 10 31.3 A- 83.5–87.7 2 6.3 B 70.2–83.4 10 31.3

B+ 79.2–83.4 6 18.8 B 74.2–79.1 1 3.1 B- 70.2–74.1 3 9.4 C 54.8–70.1 0 0.0

C+ 65.8–70.1 0 0.0 C 59.8–65.7 0 0.0 C- 54.8–59.7 0 0.0 D 40.8–54.7 1 3.1 1 3.1 F 0 –40.7 0 0.0 0 0.0

The table shows the actual grade assignments, which in some cases were higher than the numerically determined grades.