-40

-20

0

20

40

60

80

Magnitude (dB)

10^4 10^5 10^6 10^7 10^8 10^9 10^{10}

-180

-135

-90

-45

0

Phase (deg)

Bode Diagram Gm = Inf dB (at Inf rad/sec) , Pm = 31.4 deg (at 1.03e+009 rad/sec)

Frequency (rad/sec)