i r δ 0 0 180 10 7.5 170 20 14.8 160.8 30 22.0 152.0 40 28.7 145.2 50 35.0 140.0 60 40.4 138.4 70 44.7 141.2 80 47.4 150.4 90 48.4 166.4 sin(i) sin(r) = 1.336