KE v (m/s) B (T) R Protons 1 MeV 1.4 × 107 1 15 cm 50 MeV 9.4 × 107 1 1.04 m 1/10 10.4 m 500 GeV 2.99999 × 108 1.5 1.1 km 7,000 GeV ∼c 5.5 4.2 km Electrons 15 eV 2.3 × 106 0.5 × 10−4 26 cm 100 keV 1.6 × 108 1 1.1 mm 1/10 11 mm 500 keV 2.6 × 108 1 2.9 mm 1/10 2.9 cm