fn = νn2L νair ≈ 340 m/s L f1 (Hz) λ1 1 cm 17,000 2 cm 10 cm 1700 20 cm 1 m 170 200 cm 10 m 17 20 m

Hearing of young people:

∼ 20 Hz - ∼ 20 kHz